Center at RA 12 26 14.868 DEC 48 29 34.75

CONT: HARO29 1418.947 MHZ IPOL HARO29NA NH.CVL25.1

PLot file version 3 created 09-JAN-2011 14:49:28

Cont peak flux = 2.6840E-02 JY/BEAM Levs = 2.069E-03 * (2, 5, 10, 20, 40, 80)

650 600 550 500 450 400

88 89 90

PIXELS

650 600 550 500 450 400

91 92 93

PIXELS

400 450 500 550 600 650

650 600 550 500 450 400

94 95

400 450 500 550 600 650

96