Center at RA 12 26 16.830 DEC 48 29 35.50

CONT: HARO29 1419.142 MHZ IPOL HARO29NA.CVL25.1

PLot file version 11 created 04-SEP-2010 18:24:22

Cont peak flux = 2.5411E-02 JY/BEAM Levs = 1.190E-03 * (2.500, 5, 10, 20, 40, 80)

650 600 550 500 450 400

52 53 54

PIXELS

650 600 550 500 450 400

55 56 57

PIXELS

400 450 500 550 600

650 600 550 500 450 400

58 59

400 450 500 550 600

60