Gain phs vs IAT time for D75_C2.NEWCH0.1 SN 1 Rpol & Lpol IF 1

Plot file version 1 created 16-JUL-2011 14:43:42

1R VLA: N18 250 200 150 2R VLA: N1 80 60 40 20 3R VLA: E16 50 0 -50 4R VLA: W2

-105 -110 -115

5R VLA: N6

Degrees

100 80 60 6R VLA: W8 106 104 102 100 98 7R VLA: E10 200 150 100 50 8R VLA: W12 200 150 100 50 9R VLA: N8

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05

145 140 135

Gain phs vs IAT time for D75_C2.NEWCH0.1 SN 1 Rpol & Lpol IF 1

Plot file version 2 created 16-JUL-2011 14:43:42

10R VLA: E8 150 100 50 0 11R VLA: W4 300 250 200 150 12R VLA: E2 120 100 80 60 15R VLA: E4 0.005 0.000 -0.005

16R VLA: N14

Degrees

150 100 50 17R VLA: E12 300 250 200 18R VLA: N4 100 80 60 19R VLA: E14 100 50 0 -50 20R VLA: W16

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05

-40 -60 -80 -100

Gain phs vs IAT time for D75_C2.NEWCH0.1 SN 1 Rpol & Lpol IF 1

Plot file version 3 created 16-JUL-2011 14:43:42

21R VLA: W6 60 40 20 0 -20 -40 22R VLA: W18 160 140 120 100 23R VLA: W14 0 -50 -100

24R VLA: E6 -20 -40 -60 -80 -100

25R VLA: N2

Degrees

150 100 50 0 26R VLA: N16 200 150 100 50 27R VLA: N12 250 200 150 100 28R VLA: E18

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05

60 40 20