IF 1(R)

1.3 1.1 0.9 0.7

200 -200

Plot file version 1 created 25-JUL-2011 17:36:25 0542+498 D75 B1A.LINCOP.1 Freq = 1.4188 GHz, Bw = 1.306 MH Bandpass table # 1

Lower frame: BP ampl Top frame: BP phase Bandpass table spectrum Antenna: * Timerange: 00/01:39:45 to 00/01:46:25

VLA: N36 1

IF 1(L)

VLA: N36 1

IF 1(R)

VLA: E32 2

IF 1(L)

1.3 1.1 0.9 0.7

200 -200 VLA: E32 2

IF 1(R)

VLA: E20 3

IF 1(L)

VLA: E20 3

IF 1(R)

Channels

0 20 40 60 80 100

1.3 1.1 0.9 0.7

200 -200 VLA: N28 5

IF 1(L)

Channels

0 20 40 60 80 100

VLA: N28 5

IF 1(R)

Channels

0 20 40 60 80 100

VLA: W8 6

IF 1(L)

1.3 1.1 0.9 0.7

200 -200

Plot file version 2 created 25-JUL-2011 17:36:25 0542+498 D75 B1A.LINCOP.1 Freq = 1.4188 GHz, Bw = 1.306 MH Bandpass table # 1

Lower frame: BP ampl Top frame: BP phase Bandpass table spectrum Antenna: * Timerange: 00/01:39:45 to 00/01:46:25

VLA: W8 6

IF 1(R)

VLA: N4 7

IF 1(L)

VLA: N4 7

IF 1(R)

1.3 1.1 0.9 0.7

200 -200 VLA: W4 8

IF 1(L)

VLA: W4 8

IF 1(R)

VLA: N8 9

IF 1(L)

Channels

0 20 40 60 80 100

1.3 1.1 0.9 0.7

200 -200 VLA: N8 9

IF 1(R)

Channels

0 20 40 60 80 100

VLA: E8 10

IF 1(L)

Channels

0 20 40 60 80 100

VLA: E8 10

IF 1(R)

1.3 1.1 0.9 0.7

200 -200

Plot file version 3 created 25-JUL-2011 17:36:25 0542+498 D75 B1A.LINCOP.1 Freq = 1.4188 GHz, Bw = 1.306 MH Bandpass table # 1

Lower frame: BP ampl Top frame: BP phase Bandpass table spectrum Antenna: * Timerange: 00/01:39:45 to 00/01:46:25

VLA: W16 11

IF 1(L)

VLA: W16 11

IF 1(R)

VLA: E28 12

IF 1(L)

1.3 1.1 0.9 0.7

200 -200 VLA: E28 12

IF 1(R)

VLA: E4 15

IF 1(L)

VLA: E4 15

IF 1(R)

Channels

0 20 40 60 80 100

1.3 1.1 0.9 0.7

200 -200 VLA: E12 17

IF 1(L)

Channels

0 20 40 60 80 100

VLA: E12 17

IF 1(R)

Channels

0 20 40 60 80 100

VLA: E16 19

IF 1(L)

1.3 1.1 0.9 0.7

200 -200

Plot file version 4 created 25-JUL-2011 17:36:25 0542+498 D75 B1A.LINCOP.1 Freq = 1.4188 GHz, Bw = 1.306 MH Bandpass table # 1

Lower frame: BP ampl Top frame: BP phase Bandpass table spectrum Antenna: * Timerange: 00/01:39:45 to 00/01:46:25

VLA: E16 19

IF 1(R)

VLA: W20 20

IF 1(L)

VLA: W20 20

IF 1(R)

1.3 1.1 0.9 0.7

200 -200

VLA: W28 21

IF 1(L)

VLA: W28 21

IF 1(R)

VLA: W36 22

IF 1(L)

Channels

0 20 40 60 80 100

1.3 1.1 0.9 0.7

200 -200

VLA: W36 22

IF 1(R)

Channels

0 20 40 60 80 100

VLA: W24 23

IF 1(L)

Channels

0 20 40 60 80 100

VLA: W24 23

IF 1(R)

1.3 1.1 0.9 0.7

200 -200

Plot file version 5 created 25-JUL-2011 17:36:25 0542+498 D75 B1A.LINCOP.1 Freq = 1.4188 GHz, Bw = 1.306 MH Bandpass table # 1

Lower frame: BP ampl Top frame: BP phase Bandpass table spectrum Antenna: * Timerange: 00/01:39:45 to 00/01:46:25

VLA: N32 24

IF 1(L)

VLA: N32 24

IF 1(R)

VLA: N24 25

IF 1(L)

1.3 1.1 0.9 0.7

200 -200

VLA: N24 25

IF 1(R)

VLA: N16 26

IF 1(L)

VLA: N16 26

IF 1(R)

Channels

0 20 40 60 80 100

1.3 1.1 0.9 0.7

200 -200

VLA: N20 27

IF 1(L)

Channels

0 20 40 60 80 100

VLA: N20 27

IF 1(R)

Channels

0 20 40 60 80 100

VLA: E36 28

IF 1(L)

1.3 1.1 0.9 0.7

200 -200

Plot file version 6 created 25-JUL-2011 17:36:25 0542+498 D75 B1A.LINCOP.1 Freq = 1.4188 GHz, Bw = 1.306 MH Bandpass table # 1

Lower frame: BP ampl Top frame: BP phase Bandpass table spectrum Antenna: * Timerange: 00/01:39:45 to 00/01:46:25

VLA: E36 28