Center at RA 09 36 03.764 DEC 71 24 27.50

CONT: UGC 5139 1419.074 MHZ IPOL DDO63NA.CVL25.1

PLot file version 1 created 13-NOV-2009 13:37:56

Cont peak flux = 4.0955E-02 JY/BEAM Levs = 1.000E-03 * (3.800, 4.560, 7.600, 15.20, 30.40, 60.80, 121.6)

800 700 600 500 400 300 200

25 26 27

PIXELS

800 700 600 500 400 300 200

28 29 30

PIXELS

200 400 600 800

800 700 600 500 400 300 200

31 32

200 400 600 800

33

Center at RA 09 36 03.764 DEC 71 24 27.50

CONT: UGC 5139 1419.184 MHZ IPOL DDO63NA.CVL25.1

PLot file version 2 created 13-NOV-2009 13:37:57

Cont peak flux = 4.0955E-02 JY/BEAM Levs = 1.000E-03 * (3.800, 4.560, 7.600, 15.20, 30.40, 60.80, 121.6)

800 700 600 500 400 300 200

34 35 36

PIXELS

800 700 600 500 400 300 200

37 38 39

PIXELS

200 400 600 800

800 700 600 500 400 300 200

40 41

200 400 600 800

42

Center at RA 09 36 03.764 DEC 71 24 27.50

CONT: UGC 5139 1419.294 MHZ IPOL DDO63NA.CVL25.1

PLot file version 3 created 13-NOV-2009 13:37:58

Cont peak flux = 4.0955E-02 JY/BEAM Levs = 1.000E-03 * (3.800, 4.560, 7.600, 15.20, 30.40, 60.80, 121.6)

800 700 600 500 400 300 200

43 44 45

PIXELS

800 700 600 500 400 300 200

46 47 48

PIXELS

200 400 600 800

800 700 600 500 400 300 200

49 50

200 400 600 800

51

Center at RA 09 36 03.764 DEC 71 24 27.50

CONT: UGC 5139 1419.404 MHZ IPOL DDO63NA.CVL25.1

PLot file version 4 created 13-NOV-2009 13:37:59

Cont peak flux = 4.0955E-02 JY/BEAM Levs = 1.000E-03 * (3.800, 4.560, 7.600, 15.20, 30.40, 60.80, 121.6)

800 700 600 500 400 300 200

52 53 54

PIXELS

800 700 600 500 400 300 200

55 56 57

PIXELS

200 400 600 800

800 700 600 500 400 300 200

58 59

200 400 600 800

60

Center at RA 09 36 03.764 DEC 71 24 27.50

CONT: UGC 5139 1419.514 MHZ IPOL DDO63NA.CVL25.1

PLot file version 5 created 13-NOV-2009 13:38:00

Cont peak flux = 4.0955E-02 JY/BEAM Levs = 1.000E-03 * (3.800, 4.560, 7.600, 15.20, 30.40, 60.80, 121.6)

800 700 600 500 400 300 200

61 62 63

PIXELS

800 700 600 500 400 300 200

64 65 66

PIXELS

200 400 600 800

800 700 600 500 400 300 200

67 68

200 400 600 800

69

Center at RA 09 36 03.764 DEC 71 24 27.50

CONT: UGC 5139 1419.624 MHZ IPOL DDO63NA.CVL25.1

PLot file version 6 created 13-NOV-2009 13:38:01

Cont peak flux = 4.0955E-02 JY/BEAM Levs = 1.000E-03 * (3.800, 4.560, 7.600, 15.20, 30.40, 60.80, 121.6)

800 700 600 500 400 300 200

70 71 72

PIXELS

800 700 600 500 400 300 200

73 74 75

PIXELS

200 400 600 800

800 700 600 500 400 300 200

76 77

200 400 600 800

78

Center at RA 09 36 03.764 DEC 71 24 27.50

CONT: UGC 5139 1419.734 MHZ IPOL DDO63NA.CVL25.1

PLot file version 7 created 13-NOV-2009 13:38:02

Cont peak flux = 4.0955E-02 JY/BEAM Levs = 1.000E-03 * (3.800, 4.560, 7.600, 15.20, 30.40, 60.80, 121.6)

800 700 600 500 400 300 200

79 80 81

PIXELS

800 700 600 500 400 300 200

82 83 84

PIXELS

200 400 600 800

800 700 600 500 400 300 200

85 86

200 400 600 800

87

Center at RA 09 36 03.764 DEC 71 24 27.50

CONT: UGC 5139 1419.843 MHZ IPOL DDO63NA.CVL25.1

PLot file version 8 created 13-NOV-2009 13:38:03

Cont peak flux = 4.0955E-02 JY/BEAM Levs = 1.000E-03 * (3.800, 4.560, 7.600, 15.20, 30.40, 60.80, 121.6)

800 700 600 500 400 300 200

88 89 90

PIXELS

800 700 600 500 400 300 200

91 92 93

PIXELS

200 400 600 800

800 700 600 500 400 300 200

94 95

200 400 600 800

96